This figure is not available on the WWW or ftp servers.

Please consult the paper:

Barton, G. J. & Sternberg, M. J. E., (1987),

"A Strategy for the Rapid Multiple Alignment of Protein

Sequences: Confidence Levels from Tertiary

Structure Comparisons", J. Mol. Biol., 198, 327-337.

which shows the original of this Figure.